Russian Bible Guide Installation

The installation dialog helps you to install the Russian Bible Guide on your computer. The Directory field contains the directory that the Russian Bible Guide will be placed in. Unless you are sure that the drive containing this directory has enough available space (you need as much as 7.4Mb) push the Drive button and choose a suitable drive letter.

To start an istallation push OK button.

During the installation Russian Bible Guide ® Instalator performs the next actions:

Creates the Russian Bible directory

Creates a Group and and an Icon in the Program Manager shell

Modifies Win.Ini file

Restores files from diskettes to hard disk

Optionally loads and executes the Guide


Installation process

The Gauge on the bottom of the dialog window shows you a total promilleage of the process.

Press the Minimize button for backround installation. Press the Cancel button to abort the process.